
   Syntax       %SCIENTIFIC% &n&

   Purpose      Forces AMP to display all numerical output in scientific
                notation.  &n& is the number of digits to display after
                the decimal poin.  &n& can be a maximum of 15.

   Abbreviation         SCIEN for SCIENTIFIC

   %Example%

   þSCIENTIFIC 6
